The Configuration Dialog Box
Selecting Settings Configure ... opens a dialog box with several pages, selected with the icons at the left of the dialog box, which allow you to change many aspects of 's operation.

Interface
Interface Configuration.
Cursor movement after pressing Enter: 	Select whether pressing the key will move the cursor Down, Up, Right, Left, Down, First Column or None as determined by the setting in this drop down selection box.
Function shown in the status bar: 	This drop down selection box can be used to choose the calculation performed by the Statusbar Summary function.
Unit: 	Choose the default unit that will be used in your sheets.
Indentation step: 	Set the amount of indent that will be used in the cell when you choose the Increase Indent/Decrease Indent actions from the toolbar. These actions are not enabled by default in the toolbar.
Capture all navigation keys while editing 	Captures all navigation keys, the arrow keys, page up/down, tabulator and backward tabulator key, while editing a cell with the embedded editor. The embedded editor is the one appearing directly in the cell. If captured, these keys are used for navigating in the editor. Otherwise, they are used for cell navigation.
The Colors section lets you choose the color of the sheet grid. If you do not want the grid to appear at all, uncheck the Show grid box in the Format Sheet Sheet Properties dialog.
This section also lets you select the color of the lines used to indicate the printed page borders when the Page Borders box in the View menu is checked.
Select Custom from the current color to display the standard Select Color dialog.
Grid 	Click here to change the grid color the color of the borders of each cell.
Page border 	When the View Show Page Borders menu item is checked, the page borders are displayed. Click here to choose another color for the borders than the default red.

Open/Save
Open/Save Configuration.
Number of entries in Recent Files list: 	Controls the maximum number of filenames that are shown when you select File Open Recent.
Autosave interval: 	Here you can select the time between autosaves, or disable this feature altogether by choosing No autosave (by selecting the minimum value).
Create backup file: 	Check this box if you want some backup files created. This is checked per default.

Plugins
Plugins Configuration.
Check a plugin in the list to enable it. Display the About dialog by clicking the info button at the right side of the list item.

Spelling
Spell Checker Configuration.
This page lets you configure the behavior of 's spell checker.
For more information please refer to the Spell Checker documentation.

Author
Author Configuration.
Choose an author profile for your document.
You can add a new profile or delete the current profile using the buttons to the right of the profiles drop-down list.